49m40 49m50 50m00 urad

2709.8

2710

2710.2

2710.4

1358722190.0000 Jan25 2023 22:49:32 UTC

1358719790.0000 Jan25 2023 22:09:32 UTC

V1:SBE_SWEB_F0_ty_500Hz__TIME

49m40 49m50 50m00 um

-1276

-1275.5

-1275

1358722190.0000 Jan25 2023 22:49:32 UTC

1358719790.0000 Jan25 2023 22:09:32 UTC

V1:SBE_SWEB_F0_x_500Hz__TIME

49m40 49m50 50m00 um

1421.5

1422

1422.5

1423

1423.5

1358722190.0000 Jan25 2023 22:49:32 UTC

1358719790.0000 Jan25 2023 22:09:32 UTC

V1:SBE_SWEB_F0_y_500Hz__TIME

49m40 49m50 50m00 um

-780

-775

-770

-765

1358722190.0000 Jan25 2023 22:49:32 UTC

1358719790.0000 Jan25 2023 22:09:32 UTC

V1:SBE_SWEB_F0_z_500Hz__TIME

49m40 49m50 50m00

V

9.09

9.1

9.11

9.12

1358722190.0000 Jan25 2023 22:49:32 UTC

1358719790.0000 Jan25 2023 22:09:32 UTC

V1:SBE_SWEB_LVDT_F0H0_raw_500Hz__TIME

49m40 49m50 50m00

V

4.31

4.32

4.33

4.34

1358722190.0000 Jan25 2023 22:49:32 UTC

1358719790.0000 Jan25 2023 22:09:32 UTC

V1:SBE_SWEB_LVDT_F0H1_raw_500Hz__TIME

49m40 49m50 50m00

V

-0.11

-0.105

-0.1

-0.095

1358722190.0000 Jan25 2023 22:49:32 UTC

1358719790.0000 Jan25 2023 22:09:32 UTC

V1:SBE_SWEB_LVDT_F0H2_raw_500Hz__TIME

49m40 49m50 50m00

V

5.786

5.788

5.79

5.792

1358722190.0000 Jan25 2023 22:49:32 UTC

1358719790.0000 Jan25 2023 22:09:32 UTC

V1:SBE_SWEB_LVDT_F0V_raw_500Hz__TIME

49m40 49m50 50m00

V

3.725

3.73

3.735

1358722190.0000 Jan25 2023 22:49:32 UTC

1358719790.0000 Jan25 2023 22:09:32 UTC

V1:SBE_SWEB_LVDT_F1V_raw_500Hz__TIME

Hz -1 10 1 10^210 urad/sqrt(Hz)

-4 10

-3 10

-2 10

-1 10 1

1358722200.00 Jan25 2023 22:49:42 UTC dt:40s nAv:30

1358719800.0000 Jan25 2023 22:09:42 UTC

V1:SBE_SWEB_F0_ty_500Hz__FFT

Hz -1 10 1 10^210 um/sqrt(Hz)

-5 10 -4 10

-3 10 -2 10 -1 10 1

1358722200.00 Jan25 2023 22:49:42 UTC dt:40s nAv:30

1358719800.0000 Jan25 2023 22:09:42 UTC

V1:SBE_SWEB_F0_x_500Hz__FFT

Hz -1 10 1 10^210 um/sqrt(Hz)

-2 10

-1 10

1358722200.00 Jan25 2023 22:49:42 UTC dt:40s nAv:30

1358719800.0000 Jan25 2023 22:09:42 UTC

V1:SBE_SWEB_F0_y_500Hz__FFT

Hz -1 10 1 10^210 um/sqrt(Hz)

-4 10

-3 10 -2 10 -1 10 1

1358722200.00 Jan25 2023 22:49:42 UTC dt:40s nAv:30

1358719800.0000 Jan25 2023 22:09:42 UTC

V1:SBE_SWEB_F0_z_500Hz__FFT

Hz -1 10 1 10^210

V/sqrt(Hz)

-4 10

-3 10

-2 10

1358722200.00 Jan25 2023 22:49:42 UTC dt:40s nAv:30

1358719800.0000 Jan25 2023 22:09:42 UTC

V1:SBE_SWEB_LVDT_F0H0_raw_500Hz__FFT

Hz -1 10 1 10^210

V/sqrt(Hz)

-4 10

-3 10

-2 10

1358722200.00 Jan25 2023 22:49:42 UTC dt:40s nAv:30

1358719800.0000 Jan25 2023 22:09:42 UTC

V1:SBE_SWEB_LVDT_F0H1_raw_500Hz__FFT

Hz -1 10 1 10^210

V/sqrt(Hz)

-5 10

-4 10

-3 10

-2 10

1358722200.00 Jan25 2023 22:49:42 UTC dt:40s nAv:30

1358719800.0000 Jan25 2023 22:09:42 UTC

V1:SBE_SWEB_LVDT_F0H2_raw_500Hz__FFT

Hz -1 10 1 10^210

V/sqrt(Hz)

-4 10

-3 10

1358722200.00 Jan25 2023 22:49:42 UTC dt:40s nAv:30

1358719800.0000 Jan25 2023 22:09:42 UTC

V1:SBE_SWEB_LVDT_F0V_raw_500Hz__FFT

Hz -1 10 1 10^210

V/sqrt(Hz)

-4 10

-3 10

1358722200.00 Jan25 2023 22:49:42 UTC dt:40s nAv:30

1358719800.0000 Jan25 2023 22:09:42 UTC

V1:SBE_SWEB_LVDT_F1V_raw_500Hz__FFT

dataDisplay v10r12 : started by bulten on Jan 27 2023 15:53:49 UTC