x 0 0.05 0.1 0.15 -3 10×

y

0

0.05

0.1

0.15

-3 10×

200 400 600 800 1000

1200

1400

1600 3 10 ×

1169461800.00 : Jan 26 2017 10:29:42 UTC dt:10.00s

V1:EPRB_B4_PC_CAR_PWR_Image__RAW

x 0 0.05 0.1 0.15 -3 10×

y

0

0.05

0.1

0.15

-3 10×

2000

4000

6000

8000

10000

12000

14000

16000

1169461800.00 : Jan 26 2017 10:29:42 UTC dt:10.00s

V1:EPRB_B4_PC_6MHz_LSB_PWR_Image__RAW

x 0 0.05 0.1 0.15 -3 10×

y

0

0.05

0.1

0.15

-3 10×

2000

4000

6000

8000

10000

12000

1169461800.00 : Jan 26 2017 10:29:42 UTC dt:10.00s

V1:EPRB_B4_PC_6MHz_USB_PWR_Image__RAW

x 0 0.05 0.1 0.15 -3 10×

y

0

0.05

0.1

0.15

-3 10×

2000

4000

6000

8000

10000

12000

14000

16000

1169461800.00 : Jan 26 2017 10:29:42 UTC dt:10.00s

V1:EPRB_B4_PC_119MHz_LSB_PWR_Image__RAW

x 0 0.05 0.1 0.15 -3 10×

y

0

0.05

0.1

0.15

-3 10×

20 40 60 80 100 120 140 160

1169461800.00 : Jan 26 2017 10:29:42 UTC dt:10.00s

V1:EPRB_B4_PC_119MHz_USB_PWR_Image__RAW

x 0 0.5 1 1.5

y

0

0.5

1

1.5

20 40 60 80 100 120 140 160 180 6 10 ×

1169461800.00 : Jan 26 2017 10:29:42 UTC dt:10.00s

V1:EDB_B1p_PC_CAR_PWR_Image__RAW

x 0 0.5 1 1.5

y

0

0.5

1

1.5

500 1000

1500

2000

2500

3000

3500

4000 3 10 ×

1169461800.00 : Jan 26 2017 10:29:42 UTC dt:10.00s

V1:EDB_B1p_PC_6MHz_LSB_PWR_Image__RAW

x 0 0.5 1 1.5

y

0

0.5

1

1.5

500 1000

1500

2000

2500

3000

3500 3 10 ×

1169461800.00 : Jan 26 2017 10:29:42 UTC dt:10.00s

V1:EDB_B1p_PC_6MHz_USB_PWR_Image__RAW

x 0 0.5 1 1.5

y

0

0.5

1

1.5

100 200 300 400 500

600

3 10 ×

1169461800.00 : Jan 26 2017 10:29:42 UTC dt:10.00s

V1:EDB_B1p_PC_119MHz_LSB_PWR_Image__RAW

x 0 0.5 1 1.5

y

0

0.5

1

1.5

50 100 150 200 250 300 350 3 10 ×

1169461800.00 : Jan 26 2017 10:29:42 UTC dt:10.00s

V1:EDB_B1p_PC_119MHz_USB_PWR_Image__RAW

dataDisplay v9r12p20 : started by genin on Jan 26 2017 10:59:31 UTC